GIER: 25.9.2024                                                                -1-

Output from program: NYRE 1

Exponential representation:
a×(-alpha×t) + b×exp(-beta×t) + c×exp(-gamma×t)

Arne Jørgensen ve. øv.

Xenon
Htc             :  0.37
data excluded   :   2
data analyzed   :  69

                        a    alpha    b     beta    c     gamma
manual resolution :  210.00   5.50  28.00   1.15   8.70   0.049
machine resolution:  223.92   7.10  51.97   1.72   9.82   0.061
              S.D.:    1.35   0.08   1.59   0.04   0.13   0.002

S.D. of a weighting unit:   0.13

  min.     raw    res.        min.     raw    res.
 0.000  244.00   41.71       1.100   17.50   -0.35
 0.033  222.00   14.07       1.200   16.00   -0.20
 0.067  196.00   -0.72       1.300   14.00    0.68
 0.100  164.00   -0.36       1.400   13.50    0.23
 0.133  138.00    0.22       1.500   13.00   -0.07
 0.167  117.00    0.17       1.600   12.00    0.25
 0.200   98.00    2.72       1.700   11.50    0.17
 0.233   86.00    1.36       1.800   11.20   -0.03
 0.267   78.00   -1.82       1.900   11.00   -0.26
 0.300   68.00   -0.67       2.000   10.50   -0.13
 0.333   60.00    0.04       2.200   10.00   -0.22
 0.367   54.00   -0.16       2.400    9.80   -0.47
 0.400   50.00   -1.16       2.500    9.50   -0.36
 0.433   46.00   -1.35       2.600    9.30   -0.32
 0.467   43.00   -1.99       2.800    9.20   -0.50
 0.500   38.00    0.00       3.000    9.00   -0.52
 0.533   35.00    0.43       3.500    8.50   -0.44
 0.567   32.00    1.14       4.000    8.00   -0.25
 0.600   30.00    1.20       4.500    7.50   -0.02
 0.633   28.50    1.00       5.000    7.00    0.25
 0.667   27.50    0.45       5.500    6.80    0.22
 0.700   26.50    0.11       6.000    6.50    0.31
 0.733   25.50   -0.10       6.500    6.00    0.60
 0.767   24.00    0.28       7.000    5.80    0.60
 0.800   23.00    0.29       7.500    5.70    0.51
 0.833   22.50   -0.11       8.000    5.60    0.42
 0.867   22.00   -0.47       8.500    5.50    0.34
 0.900   21.00   -0.23       9.000    5.40    0.27
 0.933   20.00    0.06       9.500    5.30    0.20
 0.967   19.50   -0.12      10.000    5.00    0.33
 1.000   19.00   -0.23      11.000    4.90    0.12

  min.     raw    res.
12.000    4.80   -0.08
13.000    4.70   -0.26
14.000    4.50   -0.32
15.000    4.10   -0.17
16.000    3.80   -0.10
17.000    3.70   -0.22
18.000    3.50   -0.23
19.000    3.40   -0.32
20.000    3.10   -0.21

intercepts in percentage, a,b,c:        78.37      18.19       3.437

weighted aritmetic mean flow : 6.46 ml/g.min     without 3. phase. 6.69 ml/g.min
weighted harmonic mean flow  : 1.41 ml/g.min     without 3. phase: 4.90 ml/g.min

initial slope (log)          : 5.32 min-1

 3 min flow RD: 2.67 ml/g.min     without r.c.: 3.22 ml/g.min
 5 min flow RD: 2.28 ml/g.min     without r.c.: 3.00 ml/g.min
10 min flow RD: 1.79 ml/g.min     without r.c.: 2.87 ml/g.min